% this assumes that you have a bibliography file called ... phil.bib
% in the directory that this file is living in

\documentstyle[biblist,a4]{article}
\begin{document}
\oddsidemargin 0.5in
\nocite{*}
\bibliographystyle{biblist} % need the file biblist.bst in this
			    % directory, alternatively, try putting in
			    % prsty here to use the prsty.bst style
			    % which is a good option to use for your thesis
\bibliography{phil}
\end{document}


